RETURN TO PROGRAMS A-Z hy

ia

LENGTH OF STUDY: 10 Weeks

ACCREDITATION: Technical Training

CAMPUS: Silver King Campus, Nelson

At Selkirk College, we offer the skills and knowledge you require to successfully complete your Red Seal Certification, BC Certificate of Apprenticeship and your BC Certificate of Qualification.

Selkirk College is endorsed by the BC Industry Training Authority (ITA) to deliver all four levels of Construction Electrical Apprenticeship Technical Training as well as levels 1 and 2 of Industrial Apprenticeship Technical Training to registered Electrical Apprentices (unregistered apprentices are admitted to levels 1 - 2, space permitting).

Each level of training consists of a full-time, ten- week, on-campus program of study. Activities include classroom sessions where as an apprentice you will learn theoretical principals of electricity and applied concepts of the Canadian Electrical Code. Laboratory sessions help to reinforce electrical concepts covered by the theory classroom component.

Upon successful completion of the Level 4 technical training session, apprentices challenge the Interprovincial Trade Qualification examination. Those who pass the exam and complete the work-based hours earn the BC Certificate of Apprenticeship, the BC Certificate of Qualification, and the Interprovincial Standard Red Seal Endorsement.

ITA APPRENTICESHIP REQUIREMENTS

— 1,200 technical training hours, completed in 4 Levels (10 weeks each)

— 6,000 work-based training hours

Admission Requirements

The following admission requirements are specific to the Electrical Apprenticeship program.

— Indentured in Electrical Apprenticeship

72 Selkirk College Academic Calendar 2019-20

Electrical Apprenticeship

This is a 10-Week Technical Training program.

SEMESTER 1 Course Name ECAL 190 Electrical Apprenticeship Level 1 ECAL 290 Electrical Apprenticeship Level 2 ECAL 390 Electrical Apprenticeship Level 3 ECAL 490 Electrical Apprenticeship Level 4

Program Courses

ECAL 190 - ELECTRICAL APPRENTICESHIP LEVEL 1

— Use Essential Skills

— Use Safe Work Practices

— Use Tools and Equipment

— Apply Circuit Concepts

— Use Test Equipment

— Read and Interpret Drawings and Manuals — Apply the CEC, Regulations and Standards — Install Low Voltage Distributions Systems

— Install Control Circuits

Prerequisites: indentured in Electrical Apprenticeship

ECAL 290 - ELECTRICAL APPRENTICESHIP LEVEL 2

— Use Essential Skills

— Apply Circuit Concepts

— Use Test Equipment

— Apply the CEC, Regulations and Standards — Install Low Voltage Distributions Systems

Install Electrical Equipment

Install Control Circuits

ECAL 390 - ELECTRICAL APPRENTICESHIP LEVEL 3

— Apply Circuit Concepts — Use Test Equipment

Apply the CEC, Regulations and Standards Install Low Voltage Distributions Systems

— Install Electrical Equipment Install Control Circuits

Prerequisites: indentured in Electrical Apprenticeship

selkirk.ca/electrical-apprenticeship

On Campus On Campus On Campus

On Campus

ECAL 490 - ELECTRICAL APPRENTICESHIP LEVEL 4

Apply Circuit Concepts

— Use Test Equipment

— Apply the CEC, Regulations and Standards — Install Low Voltage Distributions Systems

— Install Electrical Equipment

— Install Control Circuits

— Install Signal and Communication Systems — Install High Voltage Systems

Prerequisites: indentured in Electrical Apprenticeship

Contact

TRADES ADMISSIONS

Phone: 1.888.953.1133 ext 13204 Direct: 250.354.3204

Email: trades@selkirk.ca

selkirk.ca/programs