SOONG SRR KO OC

Professional Businesses and Services

Business of the Month Mother Natures if Herbs ¢ Vitamins ¢ Healthy Solutions te soo

Mex Natures has been a part of Castlegar's growing Service call

success for 23 years now. The owners, Mickey and Sharon : ONLY *20 Tarasoff, along with their staff Janet, Shawna, Larissa and For friendly service anytime call Lisa, provide a variety of knowledge and helpful, friendly service. Over the years they have substantially increased their merchandise and now have one of the largest vitamin selections in the West Kootenay. The owners and staff offer extensive product knowledge and welcome all questions regarding your nutritional needs. Mother Natures friendly and natural atmosphere is located at 276 Columbia Avenue in downtown Castlegar. Take advantage of our

365-7750 sr

Michey's Mobile offering foot care in

Outlasts any other material the comfort of your home by a R.N. Heating, & automated controls . if Purnace Parts & Sererce|| | Variety of colours + Free estimates 365-0292

Oil « Gas Electric Proven Product since 1963 365-7573

MONASHEE Lf KABATOFF’S SAND © If

Electrical Services Ltd. AND GRAVEL E

Tol. 365-6385 FAX# 365-FAXS |} — PHOTOCOPYING —

— FAXING (Send & Receive) —

‘Stationery © Computer Diskettes Ribbons © Rubber Stamps © Business Cards latetheads & Envelopes * Magnetic Signs

Stationery

WEST KOOTENAY PAINTING AND SANDBLASTING

Mobile Painting & Sandblasting Quality Work - Reasonable Rates

SENIORS DISCOUNT FREE ESTIMATES ,

365-0999

We have what you're looking for... |i ALIZED CONTRA Garcon, iwc” il emer come ccereas PRAT SERVICES

© Office support services

: * Spiral binding = VISIT OUR SHOWROOM Canac of Castlegar CASTLEGAR BUSINESS SERVICES 1] Creag agg. sn wssniicnrntn 00 1402 Columbia Avenue « 365-4909 | 365-0762

KOOTENAY PLUMBING SUPPLIES WIN Surgenor & Rogers

PI DESIGN CENTRE IVERS cmbing & Heating Showroom : , CERTIFIED GENERAL ACCOUNTANTS We carty a complete line of plumbing fixtures, tie, 2 Controls and Refrigeration Ltd.

Far maga als & tins o complete © Heating * Air Conditioning © C — 1444 Columbia Avenue, Castlegar, B.C. VIN 3H4 — é oP ive Mai * Building HVAC a : wemscer™ oo Seal meee RESIDENT PARTNER BUS:604-365-7208 2245-th Columbia Ave., Catiogar * DESIGN * INSTALLATION " NEIL E. SURGENOR C.G.A. FAX:604-365-3098 Ph: 365-2991 Fax: & 365-4999

4WILLIAMS ARROW LAKES AIR CONDITIONI [ BENNO: S Bioae MECHANICAL SYSTEMS LTD. © PLUMBING * HEATING © GAS FITTING PLUMBING * HOT WATER HEATING + RENOVATIONS

© SHEET METAL * AIR CONDITIONING j KEITH ERWIN

¢ COMMERCIAL REFRIGERATION

365- 2 : 69 © Fax 365-2998 Phone 365-2485 « Fax 7626 Ph: 365-77 613 - 13th Street, Units 1 & 2, Castlegar, BC 2245 6th Avenue, Castlegar, BC VIN 2W1

A

am | FGSGS Pay ee dasa niacin yaaa ee ne AY Mii oe TN ctice